From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 math/curfit/doc/cveval.hlp | 33 +++++++++++++++++++++++++++++++++
 1 file changed, 33 insertions(+)
 create mode 100644 math/curfit/doc/cveval.hlp

(limited to 'math/curfit/doc/cveval.hlp')

diff --git a/math/curfit/doc/cveval.hlp b/math/curfit/doc/cveval.hlp
new file mode 100644
index 00000000..48cd7f10
--- /dev/null
+++ b/math/curfit/doc/cveval.hlp
@@ -0,0 +1,33 @@
+.help cveval Jun84 "Curfit Package"
+.ih
+NAME
+cveval -- evaluate the fitted function at a single x value
+.ih
+SYNOPSIS
+y = cveval (cv, x)
+
+.nf
+pointer	cv	# curve descriptor
+real	x	# x value
+.fi
+.ih
+ARGUMENTS
+.ls cv    
+Pointer to the curve descriptor structure.
+.le
+.ls x   
+X value at which the curve is to be evaluated.
+.le
+.ih
+DESCRIPTION
+Evaluate the curve at the specified value of x. CVEVAL is a real
+function which returns the fitted y value.
+.ih
+NOTES
+It uses the coefficient array stored in the curve descriptor structure.
+The x values are assumed to lie in the region xmin <= x <= xmax. Checking
+for out of bounds x values is the responsibility of the user.
+.ih
+SEE ALSO
+cvvector
+.endhelp
-- 
cgit 

