From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 math/gsurfit/doc/gssave.hlp | 39 +++++++++++++++++++++++++++++++++++++++
 1 file changed, 39 insertions(+)
 create mode 100644 math/gsurfit/doc/gssave.hlp

(limited to 'math/gsurfit/doc/gssave.hlp')

diff --git a/math/gsurfit/doc/gssave.hlp b/math/gsurfit/doc/gssave.hlp
new file mode 100644
index 00000000..a6faf568
--- /dev/null
+++ b/math/gsurfit/doc/gssave.hlp
@@ -0,0 +1,39 @@
+.help gssave Aug85 "Gsurfit Package"
+.ih
+NAME
+gssave -- save parameters of the fit
+.ih
+SYNOPSIS
+call gssave (sf, fit)
+
+.nf
+pointer	sf		# surface descriptor
+real	fit[ARB]	# fit array
+.fi
+.ih
+ARGUMENTS
+.ls sf     
+Pointer to the surface descriptor structure.
+.le
+.ls fit    
+Array containing fit parameters. The size of the fit array can be determined
+by a call to gsstati.
+.le
+
+.nf
+	    len_fit = gsstati (sf, GSNSAVE)
+.fi
+.ih
+DESCRIPTION
+GSSAVE saves the surface parameters in the real array fit. The first eight
+elements of fit contain the surface_type, xorder, yorder, xterms, xmin,
+xmax, ymin and ymax. The coefficients are stored in the remaining array
+elements.
+.ih
+NOTES
+GSSAVE does not preserve the matrices and vectors used by the fitting
+routines.
+.ih
+SEE ALSO
+gsrestore
+.endhelp
-- 
cgit 

