From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 math/iminterp/doc/asiinit.hlp | 39 +++++++++++++++++++++++++++++++++++++++
 1 file changed, 39 insertions(+)
 create mode 100644 math/iminterp/doc/asiinit.hlp

(limited to 'math/iminterp/doc/asiinit.hlp')

diff --git a/math/iminterp/doc/asiinit.hlp b/math/iminterp/doc/asiinit.hlp
new file mode 100644
index 00000000..711d7969
--- /dev/null
+++ b/math/iminterp/doc/asiinit.hlp
@@ -0,0 +1,39 @@
+.help asiinit Dec98 "Image Interpolator Package"
+.ih
+NAME
+asiinit -- initialize the sequential interpolant descriptor using default parameters
+.ih
+SYNOPSIS
+include <math/iminterp.h>
+
+asiinit (asi, interp_type)
+
+.nf
+    pointer	asi		#O interpolant descriptor
+    int		interp_type	#I interpolant type
+.fi
+
+.ih
+ARGUMENTS
+.ls asi   
+Pointer to sequential interpolant descriptor.
+.le
+.ls interp_type
+Interpolant type. The options are II_NEAREST, II_LINEAR, II_POLY3, II_POLY5,
+II_SPLINE3, II_SINC, II_LSINC, and II_DRIZZLE for nearest neighbor, linear,
+3rd order polynomial, 5th order polynomial, cubic spline, sinc, look-up
+table sinc, and drizzle respectively. The interpolant type definitions are
+found in the package header file math/iminterp.h.
+.le
+.ih
+DESCRIPTION
+The interpolant descriptor is allocated and initialized. The pointer asi is
+returned by ASIINIT. The sinc interpolant width defaults to 31 pixels. The
+look-up table sinc interpolant resolution defaults to 20 intervals or
+0.05 pixels. The drizzle pixel fraction defaults to 1.0.
+.ih
+NOTES
+ASIINIT or ASISINIT must be called before using any other ASI routines.
+.ih
+SEE ALSO
+asisinit, asifree
-- 
cgit 

