From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 noao/imred/ccdred/ccdtest/demo.hlp | 27 +++++++++++++++++++++++++++
 1 file changed, 27 insertions(+)
 create mode 100644 noao/imred/ccdred/ccdtest/demo.hlp

(limited to 'noao/imred/ccdred/ccdtest/demo.hlp')

diff --git a/noao/imred/ccdred/ccdtest/demo.hlp b/noao/imred/ccdred/ccdtest/demo.hlp
new file mode 100644
index 00000000..c03d5efb
--- /dev/null
+++ b/noao/imred/ccdred/ccdtest/demo.hlp
@@ -0,0 +1,27 @@
+.help demo Oct87 noao.imred.ccdred.ccdtest
+.ih
+NAME
+demo -- Run a demonstration of the CCD reduction package
+.ih
+USAGE
+demo
+.ih
+PARAMETERS
+.ls demofile = "ccdtest$demo.dat"
+Demonstration playback file.
+.le
+.ih
+DESCRIPTION
+This script task runs a demonstration playback.  The playback file
+is specified by a hidden parameter.  Normally this default playback file
+is used.  The default demonstration will use the task \fBtv.display\fR if it
+is loaded to show you the CCD frames being processed.
+.ih
+EXAMPLES
+1. To run a demonstration of the \fBccdred\fR package:
+
+	cl> demo
+.ih
+SEE ALSO
+stty
+.endhelp
-- 
cgit 

