From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 noao/imred/crutil/doc/crcombine.hlp | 35 +++++++++++++++++++++++++++++++++++
 1 file changed, 35 insertions(+)
 create mode 100644 noao/imred/crutil/doc/crcombine.hlp

(limited to 'noao/imred/crutil/doc/crcombine.hlp')

diff --git a/noao/imred/crutil/doc/crcombine.hlp b/noao/imred/crutil/doc/crcombine.hlp
new file mode 100644
index 00000000..3dddaebe
--- /dev/null
+++ b/noao/imred/crutil/doc/crcombine.hlp
@@ -0,0 +1,35 @@
+.help crcombine Apr98 noao.imred.crutil
+.ih
+NAME
+crcombine -- combine multiple exposures to eliminate cosmic rays
+.ih
+USAGE	
+.nf
+crcombine input output
+.fi
+.ih
+PARAMETERS
+See parameters for \fBimcombine\fR.
+.ih
+DESCRIPTION
+This task is a version of \fBimcombine\fR.  See the help for that task
+for a description of the parameters and algorithms.
+
+For the purpose of removing cosmic rays the most useful options
+are the "crreject" algorithm and/or combining with a median.  Many other
+options may work as well.  The best use of this task depends on the
+number of images available.  If there are more than a few images the
+images should be combined with an "average" and using a rejection
+algorithm.
+.ih
+EXAMPLES
+1.  To combine two images using the gain and read noise parameters in
+the image header:
+
+.nf
+    cl> crcombine obj012,obj013 abc gain=gain rdnoise=rdnoise 
+.fi
+.ih
+SEE ALSO
+imcombine
+.endhelp
-- 
cgit 

