From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 noao/imred/quadred/doc/quadscale.hlp | 37 ++++++++++++++++++++++++++++++++++++
 1 file changed, 37 insertions(+)
 create mode 100644 noao/imred/quadred/doc/quadscale.hlp

(limited to 'noao/imred/quadred/doc/quadscale.hlp')

diff --git a/noao/imred/quadred/doc/quadscale.hlp b/noao/imred/quadred/doc/quadscale.hlp
new file mode 100644
index 00000000..7493bcf6
--- /dev/null
+++ b/noao/imred/quadred/doc/quadscale.hlp
@@ -0,0 +1,37 @@
+.help quadscale Aug01 noao.imred.quadred
+.ih
+NAME
+quadscale -- Scale amplifier sections by separate gains
+.ih
+USAGE
+quadscale input output
+.ih
+PARAMETERS
+.ls input
+Input image in \fBquadformat\fR to be scaled.
+.le
+.ls output
+Output scaled image in \fBquadformat\fR.
+.le
+.ls gain11 = 1., gain12 = 1., gain21 = 1., gain22 = 1.
+Gain factors for each quadrant.
+.le
+.ls operation = "multiply" (multiply|divide)
+The operation to apply with the gains.
+.le
+.ih
+DESCRIPTION
+This task multiplies or divides by gain factors for each amplifier in
+\fBquadformat\fR.
+.ih
+EXAMPLES
+
+1. To multiply by different gain factors.
+
+.nf
+    qu> quadscale quad0072 test gain11=1.2 gain12=1.3 gain21=1.4
+.fi
+.ih
+SEE ALSO
+quadformat
+.endhelp
-- 
cgit 

