From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 noao/imred/vtel/doc/getsqib.hlp | 33 +++++++++++++++++++++++++++++++++
 1 file changed, 33 insertions(+)
 create mode 100644 noao/imred/vtel/doc/getsqib.hlp

(limited to 'noao/imred/vtel/doc/getsqib.hlp')

diff --git a/noao/imred/vtel/doc/getsqib.hlp b/noao/imred/vtel/doc/getsqib.hlp
new file mode 100644
index 00000000..1bf24fb0
--- /dev/null
+++ b/noao/imred/vtel/doc/getsqib.hlp
@@ -0,0 +1,33 @@
+.help getsqib Jan85 noao.imred.vtel
+.ih
+NAME
+getsqib -- Extract a full disk squibby brightness image from a full disk image
+.ih
+USAGE
+getsqib inputimage outputimage
+.ih
+PARAMETERS
+.ls inputimage
+Name of image to get squibby brightness from.
+.le
+.ls outputimage
+Name of new output squibby brightness image.
+.le
+.ih
+DESCRIPTION
+Getsqib takes as input any full disk image and extracts the lower four bits
+from each pixel and stores this information in a new output image the same
+size as the input image.
+.ih
+EXAMPLES
+1. To extract the squibby brightness image from the image "test1" and store
+it in an image called "test1.sqib" the command would be:
+
+.nf
+	vt> getsqib test1 test1.sqib
+.fi
+
+.ih
+SEE ALSO
+putsqib
+.endhelp
-- 
cgit 

