From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/language/doc/clear.hlp | 22 ++++++++++++++++++++++
 1 file changed, 22 insertions(+)
 create mode 100644 pkg/language/doc/clear.hlp

(limited to 'pkg/language/doc/clear.hlp')

diff --git a/pkg/language/doc/clear.hlp b/pkg/language/doc/clear.hlp
new file mode 100644
index 00000000..c4fe3207
--- /dev/null
+++ b/pkg/language/doc/clear.hlp
@@ -0,0 +1,22 @@
+.help clear Feb86 language
+.ih
+NAME
+clear -- clear the terminal screen
+.ih
+USAGE
+clear
+.ih
+DESCRIPTION
+The \fIclear\fR command clears the terminal screen.  For this to work properly
+the environment variable \fIterminal\fR must correctly identify the terminal
+currently in use.  If the terminal should get stuck in reverse video mode,
+\fIclear\fR will restore normal video mode as well as clearing the screen.
+.ih
+EXAMPLES
+1. Clear the screen and print the current directory.
+
+	cl> cle;dir
+.ih
+SEE ALSO
+beep, stty
+.endhelp
-- 
cgit 

