From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/language/doc/logout.hlp | 28 ++++++++++++++++++++++++++++
 1 file changed, 28 insertions(+)
 create mode 100644 pkg/language/doc/logout.hlp

(limited to 'pkg/language/doc/logout.hlp')

diff --git a/pkg/language/doc/logout.hlp b/pkg/language/doc/logout.hlp
new file mode 100644
index 00000000..170822a8
--- /dev/null
+++ b/pkg/language/doc/logout.hlp
@@ -0,0 +1,28 @@
+.help logout Feb86 language
+.ih
+NAME
+logout -- log out of the CL
+.ih
+USAGE
+logout
+.ih
+DESCRIPTION
+\fILogout\fR causes the CL to shut itself down, regardless of how many
+packages may currently be active.  The only way to shut the CL down without
+killing it is to use \fIlogout\fR; \fIbye\fR is not allowed to shut the
+CL down, since it would be too easy to enter it by accident (and it takes
+a while to log back in).
+
+An error message will be printed if one attempts to log out of the CL while
+a device is still allocated.  The device should be deallocated and the
+\fIlogout\fR repeated, else type \fIlogout\fR several times and you will
+be permitted to logout with the device still allocated.
+.ih
+EXAMPLE
+1. Logout of the CL.
+
+	cl> logo
+.ih
+SEE ALSO
+deallocate, bye
+.endhelp
-- 
cgit 

