From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/plot/doc/gdevices.hlp | 75 +++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 75 insertions(+)
 create mode 100644 pkg/plot/doc/gdevices.hlp

(limited to 'pkg/plot/doc/gdevices.hlp')

diff --git a/pkg/plot/doc/gdevices.hlp b/pkg/plot/doc/gdevices.hlp
new file mode 100644
index 00000000..526a55bb
--- /dev/null
+++ b/pkg/plot/doc/gdevices.hlp
@@ -0,0 +1,75 @@
+.help gdevices Apr92 plot
+.ih
+NAME
+gdevices -- list available imaging or other graphics devices
+.ih
+USAGE
+gdevices
+.ih
+PARAMETERS
+.ls devices = "^imt"
+A list of patterns identifying the class of devices for which information
+is to be output.  If multiple patterns are given they should be separated
+by commas.  The default pattern matches all stdimage (e.g. IMTOOL) devices.
+.le
+.ls graphcap = "graphcap"
+The graphcap file to be scanned (any termcap format file will do).  By default
+the graphcap file specified by the graphcap environment variable, usually
+"dev$graphcap", is scanned.
+.le
+.ih
+DESCRIPTION
+\fBgdevices\fR prints a table of the available devices in a given class of
+devices, giving for each device a list of the aliases by which the device
+is known, the imaging resolution in X and Y, and a short description of the
+device (if present in the graphcap file entry).
+
+By default \fIgdevices\fR lists the available stdimage devices as defined in
+the active graphcap file, however, by manipulating the \fIdevices\fR and
+\fIgraphcap\fR parameters any class of devices in any file can be listed.
+.ih
+EXAMPLES
+1. List the available stdimage (e.g. IMTOOL or SAOIMAGE) devices.
+
+.nf
+    cl> gdev
+#                     ALIASES    NX   NY  DESCRIPTION
+                         imtx   512  512  Imtool display server
+           imt1 imt512 imtool   512  512  Imtool display server
+                  imt2 imt800   800  800
+                 imt3 imt1024  1024 1024
+                 imt4 imt1600  1600 1600
+                 imt5 imt2048  2048 2048
+                 imt6 imt4096  4096 4096
+			         (etc.)
+.fi
+
+2. List the available IMDKERN devices.
+
+.nf
+    cl> gdev dev=imd
+#                     ALIASES    NX   NY  DESCRIPTION
+   imdblack imdbla imdB imdbl  2048 2048
+    imdwhite imdwhi imdW imdw  2048 2048
+			         (etc.)
+.fi
+
+3. List the VMS graphics devices.
+
+.nf
+    cl> gdev dev=VMS
+#                     ALIASES    NX   NY  DESCRIPTION
+                      iism70v   512  512  NOAO Vela hosted IIS model
+                       iism75   512  512  IIS model 75 image display
+                        ui300  3130 2370  UNIX interface to the NOAO
+                         vver  2112 1636  VMS generic interface to th
+			         (etc.)
+.fi
+.ih
+BUGS
+The method used to extract device entries involves multiple scans of the
+graphcap file hence is not very efficient.
+.ih
+SEE ALSO
+system.devices, dev$graphcap
+.endhelp
-- 
cgit 

