From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/xtools/catquery/doc/cqistati.hlp | 49 ++++++++++++++++++++++++++++++++++++
 1 file changed, 49 insertions(+)
 create mode 100644 pkg/xtools/catquery/doc/cqistati.hlp

(limited to 'pkg/xtools/catquery/doc/cqistati.hlp')

diff --git a/pkg/xtools/catquery/doc/cqistati.hlp b/pkg/xtools/catquery/doc/cqistati.hlp
new file mode 100644
index 00000000..beeec2c9
--- /dev/null
+++ b/pkg/xtools/catquery/doc/cqistati.hlp
@@ -0,0 +1,49 @@
+.help cqistati Mar00 "Catquery Package"
+.ih
+NAME
+cqistati -- get an image survey results integer parameter
+.ih
+SYNOPSIS
+include <cq.h>
+
+ival = cq_istati (imres, parameter)
+
+.nf
+pointer	imres		# the survey results descriptor
+int	parameter	# the parameter to be returned
+.fi
+.ih
+ARGUMENTS
+.ls imres    
+The survey results descriptor.
+.le
+.ls parameter
+The survey parameter to be returned.  The currently supported survey
+parameters defined in cq.h are:
+.nf
+CQINQPARS	# the number of query params used to produce results
+CQIMTYPE	# the image results type, CQFITS
+CQIMRECSIZE	# the image record size, 0 if undefined 
+CQIMHSKIP	# the number of leading bytes to skip, 0 if undefined
+CQIMHREAD	# the number of leading dummy reads, 0 if undefined
+CQWCS		# the image wcs status, CQ_WFITS or CQ_WDSS or CQ_WNONE
+CQNWCS		# the number of wcs parameters, 0 if none defined
+CQNIMPARS	# the number of image parameters, 0 if none defined
+.fi
+.le
+.ih
+DESCRIPTION
+Cq_istati returns the values of image survey results integer parameters.
+Cq_istati is an integer function which returns the value of the requested
+parameter as its function value.
+
+.ih
+NOTES
+More information about the image survey results parameters and their
+relationship to the parent image survey is available by typing
+"help surveys".
+
+.ih
+SEE ALSO
+cq_istats, cq_istatt
+.endhelp
-- 
cgit 

