From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/xtools/catquery/doc/cqquery.hlp | 35 +++++++++++++++++++++++++++++++++++
 1 file changed, 35 insertions(+)
 create mode 100644 pkg/xtools/catquery/doc/cqquery.hlp

(limited to 'pkg/xtools/catquery/doc/cqquery.hlp')

diff --git a/pkg/xtools/catquery/doc/cqquery.hlp b/pkg/xtools/catquery/doc/cqquery.hlp
new file mode 100644
index 00000000..797cd72c
--- /dev/null
+++ b/pkg/xtools/catquery/doc/cqquery.hlp
@@ -0,0 +1,35 @@
+.help cqquery Mar00 "Catquery Package"
+.ih
+NAME
+cqquery -- query a catalog and return the results
+.ih
+SYNOPSIS
+
+res = cq_query (cq)
+
+.nf
+pointer	cq		# the configuration file descriptor
+.fi
+.ih
+ARGUMENTS
+.ls cq     
+The configuration file descriptor.
+.le
+.ih
+DESCRIPTION
+Cq_query is a pointer function which returns the catalog results descriptor
+as its function value. NULL is returned if an error occurs in the catalog
+query.
+.ih
+NOTES
+Cq_setcat or cq_setcatn must be called before any catalog query can be made.
+
+Cq_nqpars and either cq_gqpar or cq_gqparn must be called to determine the
+number of query parameters and get each query parameter description.
+
+Cq_sqpar or cq_sqparn must be called to replace the default query parameter
+values with the calling program values.
+.ih
+SEE ALSO
+cqfquery, cqrclose
+.endhelp
-- 
cgit 

