From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/xtools/catquery/doc/cqsqpar.hlp | 39 +++++++++++++++++++++++++++++++++++++
 1 file changed, 39 insertions(+)
 create mode 100644 pkg/xtools/catquery/doc/cqsqpar.hlp

(limited to 'pkg/xtools/catquery/doc/cqsqpar.hlp')

diff --git a/pkg/xtools/catquery/doc/cqsqpar.hlp b/pkg/xtools/catquery/doc/cqsqpar.hlp
new file mode 100644
index 00000000..57a86255
--- /dev/null
+++ b/pkg/xtools/catquery/doc/cqsqpar.hlp
@@ -0,0 +1,39 @@
+.help cqsqpar Mar00 "Catquery Package"
+.ih
+NAME
+cqsqpar -- set the value of a query parameter by name
+.ih
+SYNOPSIS
+
+parno = cq_sqpar (cq, pname, value)
+
+.nf
+pointer	cq		# the configuration file descriptor
+char	pname		# the query parameter name
+char	value		# the query parameter value
+.fi
+.ih
+ARGUMENTS
+.ls cq     
+The configuration file descriptor.
+.le
+.ls pname
+The name of the query parameter to be set.
+.le
+.ls value
+The new query parameter value.
+.le
+.ih
+DESCRIPTION
+Cq_sqpar sets the value of the named query parameter. Qq_sqpar is an integer 
+function which returns the sequence number of the requested parameter
+as its function value.  Zero is returned if the requested query parameter
+is not found.
+.ih
+NOTES
+Cq_setcat or cq_setcatn must be called before a query parameter value
+can be changed.
+.ih
+SEE ALSO
+cqnqpars, cqgpar, cqgqparn, cqsqparn
+.endhelp
-- 
cgit 

