From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 pkg/xtools/catquery/doc/cqstatt.hlp | 45 +++++++++++++++++++++++++++++++++++++
 1 file changed, 45 insertions(+)
 create mode 100644 pkg/xtools/catquery/doc/cqstatt.hlp

(limited to 'pkg/xtools/catquery/doc/cqstatt.hlp')

diff --git a/pkg/xtools/catquery/doc/cqstatt.hlp b/pkg/xtools/catquery/doc/cqstatt.hlp
new file mode 100644
index 00000000..082f5757
--- /dev/null
+++ b/pkg/xtools/catquery/doc/cqstatt.hlp
@@ -0,0 +1,45 @@
+.help cqstatt Mar00 "Catquery Package"
+.ih
+NAME
+cqstatt -- get a catalog / survey text parameter
+.ih
+SYNOPSIS
+include <cq.h>
+
+nlines = cq_statt (cq, parameter, text, maxch)
+
+.nf
+pointer	cq		# the configuration file descriptor
+int	parameter	# the parameter to be returned
+char	text		# the returned text parameter value
+int	maxch		# the maximum size of the returned text parameter
+.fi
+.ih
+ARGUMENTS
+.ls cq     
+The configuration catalog / survey file descriptor.
+.le
+.ls parameter
+The parameter to be returned.  The text parameters defined in cq.h are:
+.nf
+define	CQRECLIST	# the catalog configuration file record list
+.fi
+.le
+.ls text
+The returned text parameter value. Text parameters differ
+from string parameters only in that they may contain embedded newline
+characters.
+.le
+.ls maxch
+The maximum size in characters of the returned text.
+.le
+.ih
+DESCRIPTION
+Cq_statt returns the requested catalog / survey text parameters.
+Cq_statt is an integer function which returns the numbers of lines in the
+requested parameter value as its function value.
+
+.ih
+SEE ALSO
+cq_stati, cq_stats
+.endhelp
-- 
cgit 

