From fa080de7afc95aa1c19a6e6fc0e0708ced2eadc4 Mon Sep 17 00:00:00 2001
From: Joseph Hunkeler <jhunkeler@gmail.com>
Date: Wed, 8 Jul 2015 20:46:52 -0400
Subject: Initial commit

---
 vo/votools/doc/xrayoverlay.hlp | 65 ++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 65 insertions(+)
 create mode 100644 vo/votools/doc/xrayoverlay.hlp

(limited to 'vo/votools/doc/xrayoverlay.hlp')

diff --git a/vo/votools/doc/xrayoverlay.hlp b/vo/votools/doc/xrayoverlay.hlp
new file mode 100644
index 00000000..c6282909
--- /dev/null
+++ b/vo/votools/doc/xrayoverlay.hlp
@@ -0,0 +1,65 @@
+.help xrayoverlay Mar12 votools
+.ih
+NAME
+xrayoverlay -- Overlay RASS3 broad-band X-Ray contours in the image display
+.ih
+USAGE
+xrayoverlay image
+.ih
+PARAMETERS
+.ls image
+Input image.
+.le
+.ls size = 0.25
+Field size.
+.le
+.ls ncontours = 0
+Number of contours to be drawn.  If 0, the contour interval may
+be specified, otherwise 20-30 nicely spaced contours are 
+drawn.  A maximum of 40 contours can be drawn.
+.le
+.ls append = yes
+Append the display?
+.le
+.ls verbose = no
+Print actions?
+.le
+.ls device = "imdred"
+Overlay device.
+.le
+.ls status = 0
+Service status code.
+.le
+
+.ih
+DESCRIPTION
+The \fIRADIOOVERLAY\fR task is used to overlay contours from the RASS3
+broad-band
+all-sky survey on the image display.  If the \fIimage\fR parameter is an 
+object name, it's position will be resolved and a query for sources within
+\fIsize\fR degrees of that position will be used.  If it is an image name,
+the WCS footprint of the image will be used to generate the query.
+
+The \fICONTOUR\fR task is used to draw the overlays and should be consulted
+to adjust the overlay as desired.
+
+.ih
+EXAMPLES
+1. Display an image of m83 and overlay the RASS3 X-Ray contours in the field.
+
+.nf
+  votools> xrayoverlay m83 append-
+
+or
+
+  votools> dss m83
+  votools> xrayoverlay m83 append+
+.fi
+
+.ih
+REVISIONS
+
+.ih
+SEE ALSO
+nedoverlay, xrayoverlay, obslogoverlay, contour
+.endhelp
-- 
cgit 

