.help cveval Jun84 "Curfit Package"
.ih
NAME
cveval -- evaluate the fitted function at a single x value
.ih
SYNOPSIS
y = cveval (cv, x)

.nf
pointer	cv	# curve descriptor
real	x	# x value
.fi
.ih
ARGUMENTS
.ls cv    
Pointer to the curve descriptor structure.
.le
.ls x   
X value at which the curve is to be evaluated.
.le
.ih
DESCRIPTION
Evaluate the curve at the specified value of x. CVEVAL is a real
function which returns the fitted y value.
.ih
NOTES
It uses the coefficient array stored in the curve descriptor structure.
The x values are assumed to lie in the region xmin <= x <= xmax. Checking
for out of bounds x values is the responsibility of the user.
.ih
SEE ALSO
cvvector
.endhelp
