.help cvsave Aug84 "Curfit Package"
.ih
NAME
cvsave -- save parameters of fit
.ih
SYNOPSIS
call cvsave (cv, fit)

.nf
pointer	cv		# curve descriptor
real	fit[]		# array containing the fit parameters
.fi
.ih
ARGUMENTS
.ls cv     
The pointer to the curve descriptor structure.
.le
.ls fit  
Array containing the fit parameters.
Fit must contain at least 7 + order elements, where order is the order of the
fit as set in CVINIT.
.le
.ih
DESCRIPTION
CVSAVE saves the curve parameters in the real array fit.
The first four elements of fit contain the curve_type, order, xmin and xmax.
The coefficients are stored in the remaining array elements.
.ih
NOTES
CVSAVE does not preserve the matrices and vectors used by the fitting
routines.
.ih
SEE ALSO
cvrestore
.endhelp
