.help msigeti Dec98 msigeti.hlp
.ih
NAME
msigeti -- fetch an msi integer parameter
.ih
SYNOPSIS
include <math/iminterp.h>

ivalue = msigeti (msi, param)

.nf
    pointer	msi		#I interpolant descriptor
    int		param		#I parameter
.fi
.ih
ARGUMENTS
.ls msi      
Pointer to the sequential interpolant descriptor structure.
.le
.ls param
The parameter to be fetched. The choices are: II_MSITYPE, the interpolant
type, II_MSINSAVE, the length of the saved coefficient array, and
II_MSINSINC, the half-width of the sinc interpolant.
.le
.ih
DESCRIPTION
MSIGETI is used to determine the size of the coefficient array that
must be allocated to save the sequential interpolant description structure,
and to fetch selected sequential interpolant parameters.
.ih
NOTES
.ih
SEE ALSO
msiinit, msisinit, msigetr
.endhelp
