.help msisqgrl Dec98 "Image Interpolation Package"
.ih
NAME
msisqgrl -- integrate the interpolant over a rectangular region 
.ih
SYNOPSIS
y = msisqgrl (msi, x1, x2, y1, y2)

.nf
    pointer	msi		#I interpolant descriptor
    real	x1		#I lower x limit, 1 <= x1 <= nxpix
    real	x2		#I upper x limit, 1 <= x2 <= nxpix
    real	y1		#I lower y limit, 1 <= y1 <= nypix
    real	y2		#I upper y limit, 1 <= y2 <= nypix
.fi
.ih
ARGUMENTS
.ls msi    
Pointer to the sequential interpolant descriptor structure.
.le
.ls x1, x2
The x limits of integration
.le
.ls y1, y2
The y limits of integration.
.le
.ih
DESCRIPTION
MSISQGRL integrates the interpolant exactly for rectangular domains
of integration, including partial pixel regions.
.ih
NOTES
Checking for out of bound integration regimes is the responsibility of
the user. MSIFIT must be called before using MSISQGRL.
.ih
SEE ALSO
msigrl
.endhelp
