.help bases Jan85 utilities
.ih
NAME
bases -- Convert an integer to hex, octal, and binary
.ih
USAGE
bases i
.ih
PARAMETERS
.ls i
Integer for base conversion.
.le
.ls nbyte = 0
Number of bytes of precision.  Allowed values are "0", "1", "2", or "4".
.le
.ls verbose = yes
Print labels for columns?
.le
.ih
DESCRIPTION
The BASES task converts an input integer value to equivalent values in
other base systems.
.ih
EXAMPLES
1. Convert the number 256 (in various bases).  Note the 'x' and 'b' suffix
appended to the value to change the input base value:

.nf
	ecl> bases 256					# decimal input
	  dec    hex    octal   7654 3210 7654 3210
	  256   0100x  000400b  0000 0001 0000 0000
	ecl> bases 256x					# hex input
	  dec    hex    octal   7654 3210 7654 3210
	  598   0256x  001126b  0000 0010 0101 0110
	ecl> bases 256b					# octal input
	  dec  hex  oct   7654 3210
	  174  AEx  256b  1010 1110

.fi

.ih
SEE ALSO
.endhelp
