.help cqistats Mar00 "Catquery Package"
.ih
NAME
cqistats -- get an image survey results string parameter
.ih
SYNOPSIS
include <cq.h>

call cq_istats (imres, parameter, str, maxch)

.nf
pointer	imres		# the image survey results descriptor
int	parameter	# the parameter to be returned
char	str		# the returned string parameter value
int	maxch		# the maximum size of the string parameter
.fi
.ih
ARGUMENTS
.ls res     
The image survey results descriptor.
.le
.ls parameter
The image survey results parameter to be returned. The currently supported
image survey parameters defined in cq.h are:

.nf
CQIMCATDB	# the name of the parent configuration file
CQIMCATNAME	# the name of the parent image survey
CQIMADDRESS	# the network address used to produce the results
CQIMQUERY	# the query used to produce the results
CQIMNAME	# the output image name
CQIQPNAMES	# the results query parameter dictionary
CQIQPVALUES	# the results query parameter values dictionary
CQIQPUNITS	# the results query parameter units dictionary
.fi
.le
.ls str
Array containing returned string parameter value.
.le
.ls maxch
The maximum size in characters of the returned string value.
.le
.ih
DESCRIPTION
Cq_istats returns the values of image survey results string parameters.

.ih
NOTES
More information about the image survey results parameters and their
relationship to the parent image survey is available by typing
"help surveys".

.ih
SEE ALSO
cq_istati, cq_istatt
.endhelp
