.help cqstats Mar00 "Catquery Package"
.ih
NAME
cqstats -- get a catalog / survey string parameter
.ih
SYNOPSIS
include <cq.h>

call cq_stats (cq, parameter, str, maxch)

.nf
pointer	cq		# the configuration file descriptor
int	parameter	# the parameter to be returned
char	str		# the returned string parameter value
int	maxch		# the maximum size of the returned string parameter
.fi
.ih
ARGUMENTS
.ls cq     
The catalog / survey configuration file descriptor.
.le
.ls parameter
The parameter to be returned.  The string parameters defined
in cq.h are:
.nf
	CQCATDB		# the name of the configuration file
	CQCATNAME	# the name of the current catalog
.fi
.le
.ls str
Array containing returned string parameter.
.le
.ls maxch
The maximum size of the returned string parameter.
.le
.ih
DESCRIPTION
Cq_stats returns the requested catalog / survey string parameters.

.ih
NOTES
The current catalog name CQCATNAME is "" if the current catalog has not been
set by a call to cq_setcat or cq_setcatn.

.ih
SEE ALSO
cq_stati, cq_statt
.endhelp
