From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 math/curfit/doc/cvsave.hlp | 35 +++++++++++++++++++++++++++++++++++
 1 file changed, 35 insertions(+)
 create mode 100644 math/curfit/doc/cvsave.hlp

(limited to 'math/curfit/doc/cvsave.hlp')

diff --git a/math/curfit/doc/cvsave.hlp b/math/curfit/doc/cvsave.hlp
new file mode 100644
index 00000000..144beaff
--- /dev/null
+++ b/math/curfit/doc/cvsave.hlp
@@ -0,0 +1,35 @@
+.help cvsave Aug84 "Curfit Package"
+.ih
+NAME
+cvsave -- save parameters of fit
+.ih
+SYNOPSIS
+call cvsave (cv, fit)
+
+.nf
+pointer	cv		# curve descriptor
+real	fit[]		# array containing the fit parameters
+.fi
+.ih
+ARGUMENTS
+.ls cv     
+The pointer to the curve descriptor structure.
+.le
+.ls fit  
+Array containing the fit parameters.
+Fit must contain at least 7 + order elements, where order is the order of the
+fit as set in CVINIT.
+.le
+.ih
+DESCRIPTION
+CVSAVE saves the curve parameters in the real array fit.
+The first four elements of fit contain the curve_type, order, xmin and xmax.
+The coefficients are stored in the remaining array elements.
+.ih
+NOTES
+CVSAVE does not preserve the matrices and vectors used by the fitting
+routines.
+.ih
+SEE ALSO
+cvrestore
+.endhelp
-- 
cgit 

