From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 math/slalib/doc/dd2tf.hlp | 44 ++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 44 insertions(+)
 create mode 100644 math/slalib/doc/dd2tf.hlp

(limited to 'math/slalib/doc/dd2tf.hlp')

diff --git a/math/slalib/doc/dd2tf.hlp b/math/slalib/doc/dd2tf.hlp
new file mode 100644
index 00000000..124a7fcc
--- /dev/null
+++ b/math/slalib/doc/dd2tf.hlp
@@ -0,0 +1,44 @@
+.help dd2tf Jun99 "Slalib Package"
+.nf
+
+      SUBROUTINE slDDTF (NDP, DAYS, SIGN, IHMSF)
+
+     - - - - - -
+      D D T F
+     - - - - - -
+
+  Convert an interval in days into hours, minutes, seconds
+  (double precision)
+
+  Given:
+     NDP      i      number of decimal places of seconds
+     DAYS     d      interval in days
+
+  Returned:
+     SIGN     c      '+' or '-'
+     IHMSF    i(4)   hours, minutes, seconds, fraction
+
+  Notes:
+
+     1)  NDP less than zero is interpreted as zero.
+
+     2)  The largest useful value for NDP is determined by the size
+         of DAYS, the format of DOUBLE PRECISION floating-point numbers
+         on the target machine, and the risk of overflowing IHMSF(4).
+         For example, on the VAX, for DAYS up to 1D0, the available
+         floating-point precision corresponds roughly to NDP=12.
+         However, the practical limit is NDP=9, set by the capacity of
+         the 32-bit integer IHMSF(4).
+
+     3)  The absolute value of DAYS may exceed 1D0.  In cases where it
+         does not, it is up to the caller to test for and handle the
+         case where DAYS is very nearly 1D0 and rounds up to 24 hours,
+         by testing for IHMSF(1)=24 and setting IHMSF(1-4) to zero.
+
+  P.T.Wallace   Starlink   19 March 1999
+
+  Copyright (C) 1999 Rutherford Appleton Laboratory
+  Copyright (C) 1995 Association of Universities for Research in Astronomy Inc.
+
+.fi
+.endhelp
-- 
cgit 

