From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 pkg/language/doc/back.hlp | 28 ++++++++++++++++++++++++++++
 1 file changed, 28 insertions(+)
 create mode 100644 pkg/language/doc/back.hlp

(limited to 'pkg/language/doc/back.hlp')

diff --git a/pkg/language/doc/back.hlp b/pkg/language/doc/back.hlp
new file mode 100644
index 00000000..236d65b2
--- /dev/null
+++ b/pkg/language/doc/back.hlp
@@ -0,0 +1,28 @@
+.help back Feb86 language
+.ih
+NAME
+back -- return to the previous directory
+.ih
+USAGE
+back
+.ih
+PARAMETERS
+None.
+.ih
+DESCRIPTION
+\fIBack\fR is used after a call to \fIchdir\fR or \fIcd\fR to return to the
+previous directory.  Repetitive calls to \fIback\fR may be used to toggle
+between two directories.
+.ih
+EXAMPLES
+1. Go to the logical directory "dataio".
+
+	cl> cd dataio
+
+2. Return to the previous directory, and then go back to the dataio directory.
+
+	cl> back;back
+.ih
+SEE ALSO
+chdir, pathnames
+.endhelp
-- 
cgit 

