From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 pkg/language/doc/jobs.hlp | 50 +++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 50 insertions(+)
 create mode 100644 pkg/language/doc/jobs.hlp

(limited to 'pkg/language/doc/jobs.hlp')

diff --git a/pkg/language/doc/jobs.hlp b/pkg/language/doc/jobs.hlp
new file mode 100644
index 00000000..b23b6563
--- /dev/null
+++ b/pkg/language/doc/jobs.hlp
@@ -0,0 +1,50 @@
+.help jobs Feb86 language
+.ih
+NAME
+jobs -- display the status of background jobs
+.ih
+USAGE
+jobs
+.ih
+PARAMETERS
+None.
+.ih
+DESCRIPTION
+\fIJobs\fR is used to display the status of background jobs.
+If no job number is specified then all the status of all background
+jobs is displayed.  For each job there is one line of output, e.g.
+
+    [2]  0:14 +Running  copy file1 file2 &
+
+Here 2 is the job number of the job; 0:14 is the clock time in minutes and
+seconds since the job was submitted; `Running' indicates that the task is
+currently running while the `+' indicates that this was the last background
+job started.   The remainder of the line is a copy of the actual command
+used to start the job.
+
+The possible states for a background job are:
+
+.nf
+	Done    -- the job has finished normally
+	Exit N  -- the job terminated with exit code N
+	Stopped -- the job is waiting for input from the user
+			(see the \fIservice\fR command)
+	Running -- the job is currently executing
+.fi
+.ih
+EXAMPLES
+.nf
+cl> jobs
+    [1]  21:13  Done      mkhelp >& dev$null & 
+    [2]   0:05 +Running   count *.hlp > _junk & 
+.fi
+.ih
+BUGS
+Exit codes are rarely displayed when jobs terminate abnormally.
+The CL checks for background job termination only when a command is
+entered, hence the elapsed time shown will often be greater than it
+should be.
+.ih
+SEE ALSO
+kill, service
+.endhelp
-- 
cgit 

