From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 pkg/system/doc/deallocate.hlp | 34 ++++++++++++++++++++++++++++++++++
 1 file changed, 34 insertions(+)
 create mode 100644 pkg/system/doc/deallocate.hlp

(limited to 'pkg/system/doc/deallocate.hlp')

diff --git a/pkg/system/doc/deallocate.hlp b/pkg/system/doc/deallocate.hlp
new file mode 100644
index 00000000..803c9d6a
--- /dev/null
+++ b/pkg/system/doc/deallocate.hlp
@@ -0,0 +1,34 @@
+.help deallocate Jan86 system
+.ih
+NAME
+deallocate -- deallocate a device
+.ih
+USAGE
+deallocate device
+.ih
+PARAMETERS
+.ls device
+The device to be deallocated.
+.le
+.ls rewind = yes
+Rewind the device before deallocating?
+Ignored for devices other than magtape.
+.le
+.ih
+DESCRIPTION
+Deallocate a previously allocated device.  The CL will print an error
+message if one attempts to logout while devices are still allocated,
+but if \fIlogout\fR is typed several times you will be allowed to logout
+with the devices still allocated.  The CL does not automatically
+deallocate devices upon logout.
+.ih
+EXAMPLES
+
+1. Deallocate logical magtape drive B.
+
+	cl> dealloc mtb
+
+.ih
+SEE ALSO
+allocate, devstatus, file dev$devices, dev$tapecap
+.endhelp
-- 
cgit 

