From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 pkg/xtools/catquery/doc/cqnqpars.hlp | 32 ++++++++++++++++++++++++++++++++
 1 file changed, 32 insertions(+)
 create mode 100644 pkg/xtools/catquery/doc/cqnqpars.hlp

(limited to 'pkg/xtools/catquery/doc/cqnqpars.hlp')

diff --git a/pkg/xtools/catquery/doc/cqnqpars.hlp b/pkg/xtools/catquery/doc/cqnqpars.hlp
new file mode 100644
index 00000000..63ac4ca8
--- /dev/null
+++ b/pkg/xtools/catquery/doc/cqnqpars.hlp
@@ -0,0 +1,32 @@
+.help cqnqpars Mar00 "Catquery Package"
+.ih
+NAME
+cqnqpars -- Get the number of query parameters
+.ih
+SYNOPSIS
+
+nqpars = cq_nqpars (cq)
+
+.nf
+pointer	cq		# the configuration file descriptor
+.fi
+.ih
+ARGUMENTS
+.ls cq     
+The configuration file descriptor.
+.le
+.ih
+DESCRIPTION
+Cq_nqpars returns the number of expected catalog / survey query parameters.
+Cq_nqpars is an integer function which returns the number of expected
+catalog / survey parameters as its function value. The number of query
+parameters may be zero if the query is non-programmable. Not all query
+parameters are programmable.
+.ih
+NOTES
+The routines cq_setcat or cq_setcatn must be called before the number of
+query parameters can be requested.
+.ih
+SEE ALSO
+cqgqpar, cqgqparn, cqsqpar, cqsqparn
+.endhelp
-- 
cgit 

