From 40e5a5811c6ffce9b0974e93cdd927cbcf60c157 Mon Sep 17 00:00:00 2001
From: Joe Hunkeler <jhunkeler@gmail.com>
Date: Tue, 11 Aug 2015 16:51:37 -0400
Subject: Repatch (from linux) of OSX IRAF

---
 vo/votools/doc/hub.hlp | 56 ++++++++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 56 insertions(+)
 create mode 100644 vo/votools/doc/hub.hlp

(limited to 'vo/votools/doc/hub.hlp')

diff --git a/vo/votools/doc/hub.hlp b/vo/votools/doc/hub.hlp
new file mode 100644
index 00000000..949f559b
--- /dev/null
+++ b/vo/votools/doc/hub.hlp
@@ -0,0 +1,56 @@
+.help hub Mar12 votools
+.ih
+NAME
+hub -- Start/Stop/Status of the Hub external task
+.ih
+USAGE
+hub command
+.ih
+PARAMETERS
+.ls command
+Command to execute.  If not specified, the default action is to start
+the application.
+.le
+.ls bkg = yes
+Run the application in the background?
+.le
+.ls gui = yes
+Run the application with a GUI control window?
+.le
+.ls verbose = no
+Print actions?
+.le
+
+.ih
+DESCRIPTION
+The \fIHUB\fR task is used to start, stop, or check the status of
+the SAMP Hub.  If no command argument is given, the
+default action is to start the external JSamp Hub if it is not already running
+or if there is no internal Hub available from Topcat or Aladin, SAMP
+messaging is enabled as well
+If command is \fIstop\fR then a running Hub application is shutdown and
+SAMP messaging is disabled in the CL.
+
+If the command is \fIstatus\fR then the output will be "on" or "off"
+depending on whether a Hub is available.
+
+.ih
+EXAMPLES
+1. Demonstrated uses of the command:
+
+.nf
+  votools> hub status		# check if Hub is running
+  off
+  votools> hub start		# start Hub
+  votools> hub status		# check if Hub is running
+  on
+  votools> hub stop		# stop Hub
+.fi
+
+.ih
+REVISIONS
+.le
+.ih
+SEE ALSO
+hub, topcat, samp
+.endhelp
-- 
cgit 

