.help demo Oct87 noao.imred.ccdred.ccdtest
.ih
NAME
demo -- Run a demonstration of the CCD reduction package
.ih
USAGE
demo
.ih
PARAMETERS
.ls demofile = "ccdtest$demo.dat"
Demonstration playback file.
.le
.ih
DESCRIPTION
This script task runs a demonstration playback.  The playback file
is specified by a hidden parameter.  Normally this default playback file
is used.  The default demonstration will use the task \fBtv.display\fR if it
is loaded to show you the CCD frames being processed.
.ih
EXAMPLES
1. To run a demonstration of the \fBccdred\fR package:

	cl> demo
.ih
SEE ALSO
stty
.endhelp
