.help sleep Feb86 language
.ih
NAME
sleep -- suspend process execution for the specified interval
.ih
USAGE
sleep [nsec]
.ih
PARAMETERS
.ls nsec
The number of seconds to sleep.  Defaults to 0.
.le
.ih
DESCRIPTION
The \fIsleep\fR command causes the task to hibernate for the specified
amount of time.
.ih
EXAMPLES
1. Sleep for 10 seconds, and then ring the bell.

	cl> sleep 10; beep
.ih
SEE ALSO
wait
.endhelp
